% +------------------------------------------------------------------------+
% | Reference manual page: IOstream_ref/intro.tex
% +------------------------------------------------------------------------+
% | 10 04 2002   Mariette Yvinec
% | Package: iostream
% |
% |
% | %RefPage: end of header, begin of main body
% +------------------------------------------------------------------------+

%\clearpage
%\section{Reference pages for iostream}
\ccRefChapter{IO Streams}
\ccChapterAuthor{Andreas Fabri \and Geert-Jan Giezeman \and Lutz Kettner}

All classes in the \cgal\ kernel provide input and output operators for
IO streams.
\cgal\ provides three different printing mode, defined in the enum
\ccc{Mode}, as well as different functions to set and get
the printing mode.


\section{Classified Reference Pages}

\subsection*{Enum}
\ccRefIdfierPage{CGAL::Mode} \\

\subsection*{Functions}
\ccRefIdfierPage{CGAL::get_mode} \\
\ccRefIdfierPage{CGAL::is_ascii} \\
\ccRefIdfierPage{CGAL::is_binary} \\
\ccRefIdfierPage{CGAL::is_pretty} \\
\ccRefIdfierPage{CGAL::set_mode} \\
\ccRefIdfierPage{CGAL::set_ascii_mode} \\
\ccRefIdfierPage{CGAL::set_binary_mode} \\
\ccRefIdfierPage{CGAL::set_pretty_mode} \\
\ccRefIdfierPage{CGAL::operator>>} \\
\ccRefIdfierPage{CGAL::operator<<} \\
\ccRefIdfierPage{CGAL::iformat} \\
\ccRefIdfierPage{CGAL::oformat}

\subsection*{Classes}

\ccRefIdfierPage{CGAL::Color}\\
\ccRefIdfierPage{CGAL::Istream_iterator<T,Stream>}\\
\ccRefIdfierPage{CGAL::Ostream_iterator<T,Stream>}\\
\ccRefIdfierPage{CGAL::Verbose_ostream}\\
\ccRefIdfierPage{CGAL::Input_rep<T,F>}\\
\ccRefIdfierPage{CGAL::Output_rep<T,F>}



% +------------------------------------------------------------------------+
%%RefPage: end of main body, begin of footer
% EOF
% +------------------------------------------------------------------------+
