\begin{ccRefFunction}{to_interval}

\ccDefinition

The template function \ccRefName\ computes for a given real embeddable 
number $x$ a double interval containing $x$. 
This interval is represented by a \ccc{CGAL::Interval_nt}. 
The function is guaranteed to be well defined in case the argument type 
is a model of the \ccc{RealEmbeddable} concept. 

\ccInclude{CGAL/number_utils.h}

\ccFunction{template <class NT> Interval_nt to_interval(const NT& x);}
{}

\ccSeeAlso

\ccRefConceptPage{RealEmbeddable}\\
\ccRefConceptPage{RealEmbeddableTraits::ToInterval}\\

\end{ccRefFunction}
