% +------------------------------------------------------------------------+
% | CBP Reference Manual:  main.tex
% +------------------------------------------------------------------------+
% | Automatically generated driver file for the reference manual chapter
% | of this package. Do not edit manually, you may loose your changes.
% +------------------------------------------------------------------------+

\input{CGALPDB_ref/intro.tex}

\input{CGALPDB_ref/Atom.tex}
\input{CGALPDB_ref/Chain.tex}
\input{CGALPDB_ref/Model.tex}
\input{CGALPDB_ref/Monomer.tex}
\input{CGALPDB_ref/PDB.tex}

%% EOF
