% +------------------------------------------------------------------------+
% | CGAL Reference Manual:  wrapper.tex
% +------------------------------------------------------------------------+
% | Main TeX file for testing CGAL packages.
% +------------------------------------------------------------------------+

\documentclass{book}


\usepackage{cprog}
\usepackage{cc_manual}
\usepackage{cc_manual_index}
\usepackage{amssymb}
\usepackage{graphicx}
\usepackage{path}
\usepackage{ipe}

% page dimensions
% ---------------
% The page dimensions are compulsory and may not be changed in main.tex.

\textwidth 15.6cm 
\textheight 23 cm
\topmargin -14mm       
\evensidemargin 3mm 
\oddsidemargin 3mm

% default column layout
% ---------------------
% This is the recommended layout. It may be changed inside main.tex.

\newcommand{\cgalColumnLayout}{\ccTexHtml{%
    \ccSetThreeColumns{CGAL_Oriented_side}{}{\hspace*{8.5cm}}
    \ccPropagateThreeToTwoColumns}{}}

\sloppy

\begin{document}

\cgalColumnLayout

\include{main}

\bibliographystyle{alpha}
\bibliography{geom}

\end{document}

%% EOF %%
