%{\gray\hspace*{-1.0cm}\rule{1mm}{5mm}\hspace*{-1mm}\rule{9.95cm}{1mm}}%
{\gray\hspace*{-1.0cm}\rule{1mm}{5mm}\hspace*{-1mm}\rule{4cm}{1mm}\raisebox{-.3\height}{\large \it\ advanced\ }\rule{4cm}{1mm}}%
