%\documentclass[]{book}
\documentclass[]{article}

\usepackage{alltt}
\usepackage{cc_manual}
\usepackage{makeidx}
\usepackage{latex_converter}
\usepackage{amssymb}
\usepackage{pslatex}
\usepackage{epsf}
\usepackage{ipe}
\usepackage{path}
\usepackage{nonlinkedpath}
\usepackage{ifthen}

\lcTex{
% set this to true for generating the pdf version of the manual (using
% ps2pdf from ghostscript).  If this is true when creating postscript,
% the table of contents (and several other things) will be blue.
\newboolean{usehyperref}
\setboolean{usehyperref}{false}

\ifthenelse{\boolean{usehyperref}}{
\usepackage[ps2pdf=true,
            colorlinks=true,
            linkcolor=blue,
            bookmarksnumbered=true,
            pdftitle={CGAL Installation Manual},
            pdfkeywords={computational geometry, generic programming,
                         algorithms, software library, C++},
            pdfborder={0 0 0}]{hyperref}
}{}
}


\lcTex{
% page dimensions
% ---------------
\textwidth 15.6cm 
\textheight 23cm
\ifthenelse{\boolean{usehyperref}}{}{\topmargin -14mm}
\evensidemargin 3mm 
\oddsidemargin 3mm
\headsep 1cm
\parindent 0em
\setlength{\parskip}{1ex minus 0.9ex}
}

\newcommand{\cgalrelease}{2.2}
\lcTex{\batchmode} 

\makeindex

\begin{document}

\include{title}
\include{preface}

\tableofcontents

\newpage
\mbox{}
\newpage

\pagenumbering{arabic}

\input{installation}

\printindex

%\bibliographystyle{alpha}
%\bibliography{../cgal-manual}

\end{document}


