% +------------------------------------------------------------------------+
% | CGAL Reference Manual:  Timer intro
% +------------------------------------------------------------------------+

\ccParDims

\clearpage
\chapter{Benchmark support tools}

\section*{Summary}

This chapter decribes classes for measuring user process time and real time
as well as the memory size.

\subsection*{Classes}
\ccc{CGAL::Timer}\\
\ccc{CGAL::Real_timer}\\
\ccc{CGAL::Memory_sizer}\\
