% +------------------------------------------------------------------------+
% | CGAL Reference Manual:  Timer intro
% +------------------------------------------------------------------------+

\ccRefChapter{Benchmark Support Tools}
\ccChapterAuthor{Lutz Kettner \and Sylvain Pion}


This chapter decribes classes for measuring user process time and real time
as well as the memory size.  It also provides a profile counter tool.


\section{Classified Reference Pages}

\subsection*{Classes}
\ccc{CGAL::Timer}\\
\ccc{CGAL::Real_timer}\\
\ccc{CGAL::Memory_sizer}\\
\ccc{CGAL::Profile_counter}\\
