{\gray\hspace*{-1.0cm}\rule[-5mm]{1mm}{5mm}\hspace*{-1mm}\rule{4cm}{1mm}\raisebox{-.3\height}{\large \it\ advanced\ }\rule{4cm}{1mm}}%
