\cleardoublepage

\pagenumbering{arabic}
\gdef\ccNewRefManualStyle{\ccTrue}
\ccDefGlobalScope{CGAL::}
\marginparsep10mm
\marginparwidth15mm

\input{user_manual_d}
\lcHtml{\input{kernel_overview}}
\input{Ref_d/main}

